2to4_decoder (waves/2to4_decoder.ps) Mon Nov 30 2

time (ns) 0.0 100.0 200.0 300.0 400.0 500.0 600.0 700.0 800.0 900.0 1000.0

IN0

IN1

OUT0

OUT1

OUT2

OUT3

OUT0bar

OUT1bar

OUT2bar

OUT3bar