4b_decoded_tgate (waves/4b_decoded_tgate.ps) Wed Dec 2 0

time (ns) 0.0 500.0 1000.0 1500.0 2000.0 2500.0 3000.0 3500.0

IN

OUT

A

B

C

pass

passbar

111100001111000011110000 1111 0000 1111 0000 1111 0000 1111 0000 1111 0000

XXXX 1111 0000 11110000 1111 0000