4b_shift_contacts Wed Dec 9 06:35:19 1998

time (ns) 3200.4 3500.0 4000.0 4500.0 5000.0 5500.0 6000.0 6400.8

SHIFT

LITin

OUT

0100 1000

0000000100100011 01000101011001111000100110101011110011011110111100000001 001000110100010101100111100010011010 1011

0000010010001100 000001001000110000000100100011000000 01001000110000001000 000010000000100000001000000010000000 1000