controlpla Wed Dec 9 23:04:38 1998

time (ns) 0.0 2500.0 5000.0 7500.0 10000.0 12500.0 15000.0 17500.0 19300.0

STATE

RESTART OP ClearRegs

SetPC

MemRead InF MemWrite

ImpReg3 ImmData MRegSrc RegRead RegWrite Mem2Reg WriteZero FourImm Branch SetRM ALUSrc2

clka clkb

XX 00 01 11 01 10 11 01 10 11 01 10 11 01 10 11 01 10 11 01 10 11 01 10 11 01 10 01 10 01 10 01 10 01 11 01 10 11 01 10 01 11 01 00 01 10 01 11

XXXX 0000 0001 0010 0011 0100 0101 0110 0111 1000 1001 1010 1011 1100 1101 1110 1111 1011 0000