Fig. 1: R_3(Ws) information of WD and TBP (dashed) vs. component separation.

Fig. 2: R_3(Ws) information of WD vs. component separation, various relative phases.

(a) (b)

(c) (d) Fig. 3: (a) Two modulated Gaussian pulses with relative phase ψ = 0. (b) WD of signal in (a), R_3(Ws) = 1.31.

(c) Same pulses with relative phase ψ = ß_2 rad. (d) WD of signal in (c), R_3(Ws) = 0.31.

Fig. 4: R_3(Cs) information of matched window spectrogram vs. component separation, various relative phases.

Fig. 5: R_3(Ws) information of WD vs. SNR for signal + noise.